Table: Data of 105 pottery samples from Naukratis, Tell Defenneh and of related vessels

Reference: Mommsen. H., Cowell, M., Fletcher, Ph., Hook, D., Schlotzhauer, U., Villing, A., Weber, S., Williams, D., 2006, Neutron Activation Analysis of pottery from Naukratis and other related vessels, in press Concentrations of elements C measured by NAA, University Bonn, in μg/g (ppm), if not indicated otherwise, average errors, also in percent of C (omitted values are neg. or have an error larger than the value)

Sample factor As Ba Ca% Ce Co Cr Cs Eu Fe% Ga Nauk 1 1.000 39.9 576. 6.83 85.3 41.9 386. 16.1 1.66 6.83 27.3 Nauk 2 1.000 32.3 585. 7.10 87.7 47.0 397. 16.3 1.70 6.90 28.0 Nauk 3 1.000 43.7 516. 5.02 85.9 41.2 385. 16.2 1.67 6.80 25.8 Nauk 4 1.000 17.2 636. 7.51 109. 34.3 193. 12.1 1.58 5.09 23.8 Nauk 5 1.000 14.6 594. 7.66 86.1 67.7 474. 7.80 1.52 6.88 20.2 Nauk 6 1.000 13.8 648. 6.36 131. 45.7 306. 10.7 1.98 6.57 27.4 Nauk 7 1.000 13.3 638. 4.37 97.0 15.9 122. 10.3 1.38 3.90 25.7 Nauk 8 1.000 19.9 498. 6.41 82.9 34.5 317. 9.71 1.49 5.71 23.7 Nauk 9 1.000 2.23 558. 3.69 73.2 37.1 161. 1.41 2.03 7.40 22.1 Nauk 10 1.000 9.42 437. 7.03 81.7 19.9 206. 18.3 1.38 4.90 24.5 Nauk 11 1.000 3.74 360. 2.85 57.4 35.4 345. 8.32 1.01 5.86 22.0 Nauk 12 1.000 25.4 795. 5.29 121. 27.1 188. 24.5 2.02 6.09 30.2 Nauk 13 1.000 11.1 743. 6.19 120. 27.9 187. 22.1 2.01 5.84 24.9 Nauk 14 1.000 2.87 433. 5.45 69.0 37.0 148. 1.41 1.96 7.42 24.4 Nauk 15 1.000 1.63 637. 3.47 66.3 33.3 170. 1.52 1.94 7.29 22.6 Nauk 16 1.000 1.95 696. 3.66 64.3 33.2 154. 1.45 1.81 6.86 24.7 Nauk 17 1.000 1.68 584. 3.08 66.7 31.8 163. 1.52 1.85 6.80 22.1 Nauk 18 1.000 3.80 448. 12.9 61.3 19.8 121. 1.56 1.54 4.98 17.4 Nauk 19 1.000 3.50 480. 3.40 74.5 39.7 165. 1.45 2.15 7.99 29.3 Nauk 20 1.000 5.06 566. 6.25 85.1 27.7 197. 12.9 1.42 5.38 25.5 Nauk 21 1.000 14.6 425. 7.40 88.9 16.3 125. 14.8 1.31 4.01 18.8 Nauk 22 1.000 15.1 458. 8.90 86.7 18.2 130. 15.9 1.36 4.09 19.9 Nauk 23 1.000 7.64 450. 8.09 75.9 26.8 233. 17.1 1.27 5.28 22.6 Nauk 24 1.000 7.35 429. 5.98 80.2 17.4 169. 26.8 1.30 4.63 24.0 Nauk 25 1.000 2.03 591. 4.01 69.0 40.0 160. 1.64 2.01 7.66 25.5 Nauk 26 1.000 13.5 591. 3.60 111. 16.4 118. 11.7 1.51 4.28 29.8 Nauk 27 1.000 3.72 580. 3.65 73.3 37.4 161. 1.52 2.10 7.82 27.0 Nauk 28 1.000 6.22 433. 7.51 71.4 19.0 198. 36.0 1.29 4.28 25.0 Nauk 29 1.000 18.9 447. 3.88 145. 17.2 140. 19.1 1.09 5.25 28.3 Nauk 30 1.000 14.7 337. 4.38 39.8 32.4 437. 8.99 0.90 3.84 15.3 Nauk 32 1.000 16.2 434. 3.03 86.7 15.0 120. 9.43 1.18 3.56 21.9 Nauk 33 1.000 1.78 543. 3.27 69.0 37.4 156. 1.44 2.01 7.43 27.5 Nauk 34 1.000 4.02 479. 2.48 61.4 26.0 142. 1.13 1.69 5.78 19.1 Nauk 35 1.000 6.40 318. 11.8 31.5 32.4 212. 2.54 0.89 4.57 15.2 Nauk 36 1.000 6.73 401. 5.58 80.4 23.9 210. 98.3 1.38 5.64 22.7 Nauk 37 1.000 7.88 453. 4.16 97.0 18.6 188. 24.8 1.44 4.33 27.6 Nauk 39 1.000 12.7 598. 4.83 105. 26.5 219. 12.0 1.53 5.18 46.7 Nauk 41 1.000 12.2 557. 5.94 110. 30.6 299. 11.6 1.42 4.74 40.1 Nauk 42 1.000 15.6 611. 3.61 121. 26.9 141. 12.7 1.55 4.69 32.3 Nauk 43 1.000 19.7 590. 5.33 67.1 39.9 507. 13.2 1.23 5.23 29.9

Sample factor As Ba Ca% Ce Co Cr Cs Eu Fe% Ga Nauk 44 1.000 49.9 331. 8.21 73.1 24.1 216. 12.8 1.07 4.21 35.3 Nauk 47 1.000 57.7 854. 1.61 85.9 40.7 357. 31.9 1.38 5.69 17.8 Nauk 51 1.000 7.15 501. 6.91 66.4 43.5 438. 8.21 1.13 4.74 18.9 Nauk 52 1.000 10.3 313. 13.2 37.6 30.1 284. 2.57 1.06 5.59 28.3 Nauk 53 1.000 8.37 723. 5.45 129. 26.5 363. 13.6 1.69 4.87 58.6 Nauk 54 1.000 19.5 512. 8.49 82.1 16.4 127. 16.2 1.21 4.24 17.9 Nauk 55 1.000 10.8 273. 10.8 33.5 26.9 271. 3.23 0.90 5.07 18.9 Nauk 56 1.000 11.0 708. 14.3 42.6 18.1 224. 2.31 0.96 3.89 43.6 Nauk 57 1.000 33.8 627. 4.90 74.6 35.4 421. 12.9 1.47 5.66 46.2 Nauk 58 1.000 11.1 488. 4.67 74.9 23.6 230. 18.4 1.27 4.96 26.4 Nauk 59 1.000 5.98 218. 2.76 41.4 49.0 707. 4.44 0.78 6.06 57.6 Nauk 62 1.000 44.9 559. 5.92 72.3 20.5 153. 18.7 1.26 4.26 20.5 Nauk 63 1.000 30.0 752. 4.32 77.9 22.6 136. 16.8 1.33 4.42 13.5 Nauk 64 1.000 31.8 768. 5.72 107. 26.1 171. 24.0 1.79 5.80 20.7 Nauk 65 1.000 12.7 686. 5.13 65.2 17.8 148. 7.32 1.18 3.93 15.7 Nauk 66 1.000 5.64 490. 5.46 106. 30.6 249. 9.39 1.64 5.22 24.1 Nauk 67 1.000 8.27 336. 14.8 37.1 27.1 236. 3.52 0.91 4.78 19.9 Nauk 68 1.000 8.66 256. 13.2 39.1 29.0 377. 0.91 0.94 5.21 18.7 Nauk 69 1.000 4.39 424. 5.96 84.8 23.1 208. 13.6 1.33 4.48 20.5 Nauk 70 1.000 3.75 436. 6.33 90.4 27.8 199. 14.5 1.42 4.46 22.1 Nauk 72 1.000 20.9 473. 6.42 84.3 41.1 345. 17.6 1.52 6.49 34.6 Nauk 73 1.000 14.7 397. 4.16 84.4 18.9 95.6 9.80 1.29 4.78 26.6 Nauk 74 1.000 12.5 320. 9.40 66.8 13.4 75.2 6.93 1.10 3.72 22.8 Nauk 76 1.000 11.7 445. 8.01 76.9 17.5 173. 20.9 1.24 4.48 22.6 Nauk 77 1.000 6.37 677. 5.80 112. 26.6 189. 27.3 1.90 5.77 30.5 Nauk 78 1.000 6.49 577. 7.80 84.8 14.7 101. 7.12 1.29 3.93 21.8 Nauk 79 1.000 2.90 439. 2.86 66.7 31.5 146. 1.49 1.89 6.86 17.6 Nauk 80 1.000 5.76 187. 15.5 40.1 11.3 79.3 0.80 0.98 3.05 13.6 Nauk 81 1.000 5.11 526. 3.37 65.5 37.5 160. 1.69 1.91 7.63 26.9 Nauk 82 1.000 8.06 607. 3.21 78.3 37.4 158. 1.63 2.08 7.62 30.6 Nauk 83 1.000 1.97 541. 5.51 68.4 35.9 164. 1.52 1.97 7.22 30.9 Nauk 84 1.000 17.4 568. 6.85 90.9 37.4 340. 37.0 1.65 5.73 26.4 Nauk 85 1.000 4.33 391. 9.71 83.2 24.4 124. 7.47 1.24 4.33 24.2 Nauk 86 1.000 5.21 385. 9.65 80.3 16.0 126. 7.53 1.30 4.33 23.3 Nauk 87 1.000 7.68 503. 8.61 84.2 19.8 166. 29.6 1.39 4.40 22.0 Nauk 88 1.000 8.08 336. 8.27 45.9 32.3 463. 8.48 0.91 4.64 11.4 Defe 1 1.000 5.11 240. 6.33 56.5 58.3 580. 6.12 1.01 5.42 13.5 Defe 2 1.000 4.01 179. 9.74 47.5 56.1 526. 4.83 0.81 5.36 14.9 Defe 3 1.000 3.85 168. 7.83 43.5 56.9 608. 4.45 0.71 5.12 12.0 Defe 4 1.000 6.04 108. 8.31 41.7 51.3 634. 3.95 0.72 5.26 14.1

Sample factor As Ba Ca% Ce Co Cr Cs Eu Fe% Ga Defe 5 1.000 4.90 183. 8.29 47.5 53.3 540. 5.82 0.84 5.09 15.5 Defe 6 1.000 12.7 274. 3.28 77.8 39.9 357. 9.44 1.35 5.75 23.0 Defe 7 1.000 5.93 393. 6.12 85.0 26.9 222. 18.6 1.42 5.53 32.3 Defe 8 1.000 3.78 123. 8.00 52.5 68.4 816. 5.52 0.89 5.67 16.6 Defe 9 1.000 7.79 461. 6.73 84.1 27.9 236. 20.5 1.41 5.52 26.0 Defe 10 1.000 2.31 504. 3.41 72.6 35.4 171. 1.55 2.06 7.64 27.5 Defe 11 1.000 15.6 476. 7.02 104. 32.9 275. 11.2 1.55 5.52 29.7 Defe 12 1.000 13.2 734. 5.51 108. 31.4 254. 19.4 1.68 6.19 37.0 Defe 13 1.000 6.35 546. 5.19 81.3 23.5 214. 14.3 1.32 4.98 29.9 Defe 14 1.000 2.95 544. 3.70 82.6 25.0 225. 14.8 1.39 5.06 34.1 Defe 15 1.000 10.7 500. 3.89 78.3 25.8 213. 14.8 1.38 5.21 27.6 Defe 16 1.000 20.3 812. 2.91 89.6 25.7 157. 13.3 1.45 4.77 – Defe 17 1.000 23.2 796. 2.21 90.1 24.0 163. 14.1 1.42 4.65 17.6 Abus 1 1.000 9.01 284. 6.58 59.5 11.8 64.4 6.08 0.96 3.42 17.2 DlEgy 1 1.000 14.3 425. 6.88 102. 20.1 112. 11.5 1.62 5.72 32.3 TbEgy 1 1.000 8.89 536. 8.71 92.0 20.9 174. 30.4 1.33 4.80 29.0 Kari 1 1.000 23.0 668. 9.14 85.4 26.5 273. 10.3 1.22 5.41 25.6 Kari 2 1.000 6.78 440. 3.84 96.2 31.8 275. 8.23 1.45 5.51 23.6 Knid 1 1.000 8.36 407. 6.04 67.8 54.1 544. 7.99 1.09 5.03 20.0 Bere 11 1.000 28.8 613. 6.84 110. 35.5 299. 10.8 1.66 5.77 21.5 Emec 31 1.000 12.1 450. 9.18 80.6 33.8 342. 9.70 1.51 6.20 28.5 TeKa 3 1.000 17.9 668. 8.63 123. 39.4 333. 9.52 1.90 6.25 31.4 Kame 2 1.000 5.96 564. 0.57 48.2 10.8 58.2 3.45 1.06 3.29 19.5 Milet 41 1.000 21.7 1309. 3.40 69.0 33.0 151. 2.60 1.84 7.04 26.8 Rhod 20 1.000 4.90 186. 8.03 51.5 56.6 995. 6.07 1.00 5.57 16.8 av.meas.error 0.15 38. 0.21 1.2 0.33 2.7 0.34 0.088 0.032 3.2 in % 1.2 7.6 3.3 1.5 1.1 1.0 2.8 6.2 0.6 14.

Table Naukratis ff.

Concentrations of elements C measured by NAA, University Bonn, in μg/g (ppm), if not indicated otherwise, average errors, also in percent of C (omitted values are neg. or have an error larger than the value)

Sample factor Hf K % La Lu Na% Nd Ni Rb Sb Sc Nauk 1 1.000 5.75 3.11 42.1 0.57 0.74 36.0 374. 173. 4.13 26.5 Nauk 2 1.000 5.74 3.11 43.5 0.61 0.71 39.7 426. 177. 4.19 27.0 Nauk 3 1.000 5.68 3.13 42.0 0.59 0.74 34.5 413. 173. 3.96 26.4 Nauk 4 1.000 4.97 3.12 50.2 0.54 1.01 45.3 298. 193. 1.88 17.0 Nauk 5 1.000 3.98 2.25 40.3 0.52 0.64 38.7 876. 116. 2.45 22.5 Nauk 6 1.000 4.35 2.73 58.3 0.67 1.05 53.8 451. 168. 3.34 22.5 Nauk 7 1.000 6.48 3.38 46.5 0.51 1.37 43.5 142. 211. 1.55 12.7 Nauk 8 1.000 5.68 2.32 40.7 0.54 0.99 35.9 294. 111. 2.06 23.1 Nauk 9 1.000 7.55 1.16 31.9 0.56 1.18 34.9 123. 51.6 0.37 25.0 Nauk 10 1.000 6.09 2.59 37.4 0.52 0.69 29.3 118. 153. 1.23 21.6 Nauk 11 1.000 4.39 3.02 26.1 0.44 0.99 25.9 339. 161. 0.56 22.9 Nauk 12 1.000 5.84 2.95 56.3 0.63 1.02 50.0 175. 177. 4.30 22.1 Nauk 13 1.000 6.68 3.03 56.0 0.62 1.09 51.7 165. 176. 3.77 21.5 Nauk 14 1.000 6.92 1.18 30.3 0.54 1.13 26.5 135. 50.8 0.42 25.1 Nauk 15 1.000 8.71 1.12 30.3 0.53 1.45 30.9 124. 56.0 0.23 24.9 Nauk 16 1.000 7.48 1.27 29.0 0.51 1.54 31.9 201. 55.0 0.34 23.4 Nauk 17 1.000 8.57 1.15 29.9 0.51 1.28 32.2 121. 54.2 0.23 23.4 Nauk 18 1.000 6.48 1.12 28.0 0.44 1.12 27.9 50.6 29.9 0.49 16.8 Nauk 19 1.000 7.34 1.11 32.0 0.62 1.39 30.2 97.9 55.3 0.52 27.4 Nauk 20 1.000 5.87 2.70 40.2 0.53 0.94 32.5 201. 152. 1.22 22.2 Nauk 21 1.000 6.21 2.14 42.4 0.44 0.83 33.1 85.8 116. 0.73 16.6 Nauk 22 1.000 5.81 2.54 41.3 0.43 0.91 32.9 147. 123. 0.88 17.8 Nauk 23 1.000 5.53 1.92 36.7 0.49 1.29 32.8 210. 95.4 1.24 21.3 Nauk 24 1.000 5.98 2.66 38.2 0.50 0.64 32.2 173. 163. 0.89 20.5 Nauk 25 1.000 7.24 1.17 29.9 0.52 1.29 31.5 97.1 57.0 0.31 25.7 Nauk 26 1.000 6.20 3.59 52.2 0.58 1.20 41.6 62.3 229. 1.43 14.3 Nauk 27 1.000 7.51 1.22 31.9 0.56 1.16 34.6 128. 53.5 0.41 26.0 Nauk 28 1.000 5.55 2.71 33.9 0.54 0.48 25.0 128. 166. 0.89 21.8 Nauk 29 1.000 11.1 3.14 77.9 0.76 1.87 59.0 41.5 192. 1.22 15.6 Nauk 30 1.000 2.95 1.63 18.8 0.35 1.39 18.3 335. 71.3 0.61 16.8 Nauk 32 1.000 4.25 3.23 39.9 0.47 1.03 34.3 37.1 184. 1.40 11.4 Nauk 33 1.000 7.16 1.13 29.1 0.56 1.29 31.2 142. 51.2 0.31 25.0 Nauk 34 1.000 8.05 1.33 26.9 0.42 1.39 27.4 104. 48.5 0.29 19.4 Nauk 35 1.000 2.42 1.36 16.1 0.37 1.07 15.0 216. 46.2 0.52 20.1 Nauk 36 1.000 5.88 2.38 37.0 0.48 1.12 30.5 174. 158. 1.53 21.2 Nauk 37 1.000 6.94 2.48 43.2 0.51 0.42 31.8 104. 146. 0.84 20.5 Nauk 39 1.000 5.53 3.32 50.8 0.53 1.00 43.6 258. 210. 2.21 16.8 Nauk 41 1.000 6.13 2.94 52.5 0.49 1.03 51.1 419. 187. 1.64 14.8 Nauk 42 1.000 5.43 3.93 53.4 0.54 1.07 50.7 170. 238. 1.69 15.3 Nauk 43 1.000 4.19 2.47 31.0 0.42 0.56 29.8 473. 137. 1.91 22.2

Sample factor Hf K % La Lu Na% Nd Ni Rb Sb Sc Nauk 44 1.000 5.30 1.86 32.2 0.38 0.74 34.6 246. 106. 1.60 15.4 Nauk 47 1.000 5.45 3.13 40.1 0.44 1.25 41.6 500. 162. 2.79 21.7 Nauk 51 1.000 4.12 2.35 32.0 0.45 0.69 28.0 485. 110. 0.85 17.1 Nauk 52 1.000 3.16 2.46 42.9 0.43 1.05 20.6 208. 16.5 0.56 25.0 Nauk 53 1.000 8.78 3.59 61.2 0.43 1.18 51.6 299. 180. 1.95 14.9 Nauk 54 1.000 6.04 2.37 36.2 0.49 0.74 35.2 100. 129. 0.85 18.0 Nauk 55 1.000 2.67 1.85 16.9 0.36 1.16 18.2 205. 55.6 0.74 22.9 Nauk 56 1.000 2.51 1.67 19.2 0.34 1.00 18.0 122. 27.6 0.75 16.8 Nauk 57 1.000 4.16 3.05 37.3 0.55 0.66 37.3 398. 168. 1.82 24.1 Nauk 58 1.000 5.72 2.58 35.6 0.49 1.02 28.1 225. 136. 1.23 20.6 Nauk 59 1.000 3.39 1.66 18.9 0.35 0.53 19.8 802. 89.6 0.60 21.1 Nauk 62 1.000 4.54 2.20 34.4 0.41 1.03 27.8 128. 109. 3.15 17.0 Nauk 63 1.000 4.46 2.44 37.8 0.42 1.47 29.5 199. 119. 3.30 18.1 Nauk 64 1.000 4.31 2.81 49.7 0.51 1.45 38.6 144. 160. 3.91 21.5 Nauk 65 1.000 4.54 2.80 29.7 0.38 0.92 25.2 78.8 126. 1.27 15.3 Nauk 66 1.000 7.04 2.62 49.2 0.60 1.06 40.3 464. 161. 0.92 19.6 Nauk 67 1.000 3.07 1.00 18.2 0.39 1.19 17.2 199. 28.3 0.83 22.4 Nauk 68 1.000 3.10 1.49 18.9 0.37 0.94 17.7 225. 52.6 0.88 24.2 Nauk 69 1.000 6.60 2.14 39.9 0.54 0.94 31.8 91.3 125. 1.22 18.5 Nauk 70 1.000 6.67 2.19 41.3 0.51 0.96 32.7 – 122. 1.00 18.8 Nauk 72 1.000 5.72 2.43 40.9 0.55 0.96 34.6 287. 134. 2.89 25.0 Nauk 73 1.000 4.85 3.21 39.5 0.47 0.72 33.6 67.7 168. 1.37 18.4 Nauk 74 1.000 4.21 2.43 32.0 0.37 0.70 28.0 110. 131. 1.12 14.0 Nauk 76 1.000 5.94 2.39 36.6 0.47 0.81 30.1 78.1 138. 0.92 20.3 Nauk 77 1.000 6.30 2.95 51.0 0.58 0.97 48.0 199. 173. 2.82 21.4 Nauk 78 1.000 5.23 2.53 39.5 0.42 1.22 34.1 103. 135. 0.52 15.6 Nauk 79 1.000 6.71 1.72 28.8 0.51 2.13 28.9 93.3 44.9 0.27 23.4 Nauk 80 1.000 3.23 0.94 20.7 0.30 0.88 19.5 128. 21.0 0.53 9.85 Nauk 81 1.000 6.98 1.30 28.4 0.50 1.28 30.8 164. 54.7 0.39 25.9 Nauk 82 1.000 7.70 1.16 34.1 0.57 1.22 36.9 150. 57.1 0.40 25.8 Nauk 83 1.000 7.39 1.18 29.5 0.61 1.26 31.7 207. 53.9 0.33 24.1 Nauk 84 1.000 6.14 3.13 42.7 0.57 0.70 33.5 660. 184. 2.94 24.7 Nauk 85 1.000 4.77 2.35 39.3 0.37 0.83 31.2 353. 148. 0.83 16.7 Nauk 86 1.000 5.07 2.44 38.8 0.45 0.81 31.8 211. 141. 0.69 17.0 Nauk 87 1.000 6.25 2.58 40.3 0.50 0.67 31.4 – 147. 0.89 20.8 Nauk 88 1.000 3.46 1.58 21.1 0.33 1.37 17.0 536. 74.4 0.80 21.4 Defe 1 1.000 3.56 1.84 27.8 0.37 0.69 16.5 918. 96.0 0.63 17.5 Defe 2 1.000 2.76 1.42 22.9 0.32 0.69 14.8 767. 65.2 0.50 16.3 Defe 3 1.000 2.65 1.45 20.8 0.28 0.64 16.4 974. 69.5 0.37 15.4 Defe 4 1.000 2.61 1.53 19.9 0.28 0.72 9.40 880. 63.6 0.28 15.7

Sample factor Hf K % La Lu Na% Nd Ni Rb Sb Sc Defe 5 1.000 2.95 1.62 23.0 0.32 0.57 11.5 856. 82.8 0.42 16.1 Defe 6 1.000 5.35 2.42 36.0 0.53 1.11 27.6 397. 131. 2.02 22.1 Defe 7 1.000 5.60 2.43 40.0 0.51 0.99 31.3 205. 147. 1.54 21.8 Defe 8 1.000 2.91 1.52 26.7 0.31 0.56 17.0 1159. 79.3 0.49 16.5 Defe 9 1.000 5.62 2.23 39.7 0.53 1.01 29.5 201. 145. 1.66 21.9 Defe 10 1.000 8.64 1.36 31.9 0.55 1.58 29.9 118. 57.8 0.31 25.9 Defe 11 1.000 4.50 2.97 48.7 0.52 0.77 41.4 429. 174. 2.11 17.9 Defe 12 1.000 4.60 2.79 46.5 0.53 0.79 52.9 325. 162. 3.14 22.8 Defe 13 1.000 6.00 2.50 37.3 0.51 0.96 39.6 198. 135. 1.06 20.4 Defe 14 1.000 6.20 0.62 16.5 0.55 1.39 42.4 217. 139. 1.18 20.8 Defe 15 1.000 6.16 2.49 39.3 0.54 1.05 33.0 220. 138. 1.32 21.2 Defe 16 1.000 4.30 2.47 40.6 0.43 1.71 43.4 167. 124. 3.42 20.1 Defe 17 1.000 4.76 2.69 39.5 0.40 1.78 37.9 165. 124. 3.80 19.4 Abus 1 1.000 3.51 1.98 28.3 0.32 0.82 21.8 66.8 110. 1.25 12.4 DlEgy 1 1.000 6.11 3.92 48.7 0.57 0.92 36.6 122. 201. 2.10 21.7 TbEgy 1 1.000 6.27 2.64 40.1 0.55 0.69 33.3 206. 149. 1.12 20.3 Kari 1 1.000 4.39 2.57 38.8 0.38 0.54 33.0 273. 154. 2.33 17.1 Kari 2 1.000 7.34 2.60 45.0 0.58 1.12 37.2 434. 145. 1.57 18.7 Knid 1 1.000 4.25 2.06 31.5 0.42 0.62 25.2 475. 112. 0.87 18.3 Bere 11 1.000 3.93 2.82 51.1 0.50 1.04 45.7 451. 148. 2.95 19.8 Emec 31 1.000 5.39 1.59 39.1 0.56 1.13 35.8 310. 88.4 2.44 23.8 TeKa 3 1.000 4.57 2.84 55.8 0.58 0.78 51.6 482. 150. 2.67 21.6 Kame 2 1.000 5.29 3.64 27.8 0.30 1.31 20.2 – 125. 0.73 11.8 Milet 41 1.000 7.49 1.04 26.8 0.40 1.08 29.9 103. 56.4 1.01 23.6 Rhod 20 1.000 3.36 2.29 25.8 0.32 0.31 16.4 859. 106. 0.55 18.5 av.meas.error 0.068 0.062 0.15 0.028 0.007 2.1 44. 2.6 0.076 0.031 in % 1.3 2.8 0.4 5.8 0.7 6.5 15. 2.1 5.3 0.2

Table Naukratis ff.

Concentrations of elements C measured by NAA, University Bonn, in μg/g (ppm), if not indicated otherwise, average errors, also in percent of C (omitted values are neg. or have an error larger than the value)

Sample factor Sm Ta Tb Th Ti% U W Yb Zn Zr Nauk 1 1.000 7.87 1.28 0.99 17.5 0.64 2.88 4.08 3.78 141. 149. Nauk 2 1.000 8.01 1.36 1.00 18.0 0.69 2.82 8.13 3.95 144. 162. Nauk 3 1.000 7.20 1.23 0.97 17.5 0.63 3.04 3.95 3.75 130. 184. Nauk 4 1.000 8.51 1.37 1.19 23.1 0.54 3.77 3.24 4.22 79.6 145. Nauk 5 1.000 7.40 0.94 0.94 14.8 0.56 2.69 2.04 3.26 109. 129. Nauk 6 1.000 10.5 1.26 1.34 28.0 0.53 4.26 2.16 5.04 101. 92.2 Nauk 7 1.000 8.65 1.42 1.12 23.6 0.50 3.81 3.13 4.13 72.2 109. Nauk 8 1.000 7.24 1.15 0.83 14.7 0.66 2.58 3.48 3.55 115. 182. Nauk 9 1.000 7.10 1.30 0.99 7.11 1.13 1.37 1.17 3.22 104. 283. Nauk 10 1.000 5.72 1.31 0.73 16.2 0.56 3.49 2.52 3.33 102. 170. Nauk 11 1.000 4.50 0.90 0.60 11.5 0.55 2.23 2.23 2.70 114. 117. Nauk 12 1.000 9.81 1.17 1.24 21.0 0.56 3.87 2.54 4.36 115. 180. Nauk 13 1.000 9.87 1.17 1.15 20.4 1.34 3.99 2.46 4.35 113. 234. Nauk 14 1.000 6.00 1.33 1.02 5.83 0.89 1.61 1.65 3.36 113. 228. Nauk 15 1.000 6.70 1.44 0.94 6.79 1.06 1.68 1.81 3.34 103. 295. Nauk 16 1.000 6.48 1.27 0.89 5.80 0.99 1.38 1.67 3.10 104. 279. Nauk 17 1.000 6.55 1.38 0.88 6.60 1.12 1.41 1.62 3.16 96.7 319. Nauk 18 1.000 5.26 1.11 0.79 6.28 0.96 2.11 1.23 2.67 81.3 245. Nauk 19 1.000 6.47 1.39 0.95 6.35 1.13 1.34 2.24 3.54 127. 282. Nauk 20 1.000 6.46 1.24 0.91 16.8 0.65 3.16 2.14 3.57 117. 116. Nauk 21 1.000 6.08 1.14 0.81 14.8 0.67 3.11 2.27 2.90 87.7 209. Nauk 22 1.000 6.10 1.05 0.82 15.1 0.61 3.29 2.68 2.99 90.5 158. Nauk 23 1.000 6.09 1.18 0.80 15.3 0.74 3.02 3.04 3.27 102. 142. Nauk 24 1.000 5.74 1.35 0.83 17.9 0.61 3.12 2.75 3.38 107. 103. Nauk 25 1.000 7.25 1.40 1.03 6.57 1.15 1.58 1.14 3.23 117. 320. Nauk 26 1.000 8.94 1.53 1.16 26.1 0.52 5.01 4.61 4.46 78.0 107. Nauk 27 1.000 7.39 1.35 1.06 6.57 1.08 1.67 1.41 3.55 112. 298. Nauk 28 1.000 5.32 1.36 0.77 16.4 0.62 2.49 2.59 3.31 112. 135. Nauk 29 1.000 10.7 2.57 1.25 33.2 0.45 5.87 3.39 5.56 131. 168. Nauk 30 1.000 3.53 0.66 0.47 6.59 0.42 2.25 1.40 2.29 72.0 35.4 Nauk 32 1.000 6.12 1.23 0.96 20.5 0.37 3.50 4.32 3.62 96.6 98.4 Nauk 33 1.000 6.59 1.26 0.95 5.73 0.98 1.38 2.28 3.49 110. 288. Nauk 34 1.000 5.46 1.13 0.89 6.10 0.72 1.54 1.57 2.78 84.2 287. Nauk 35 1.000 2.91 0.46 0.57 4.56 0.60 1.43 1.55 2.14 76.3 111. Nauk 36 1.000 5.62 1.45 0.77 18.9 0.63 2.52 3.47 3.26 157. 156. Nauk 37 1.000 6.01 1.48 0.89 18.4 0.59 3.21 3.35 3.48 108. 177. Nauk 39 1.000 7.96 1.52 1.33 25.1 0.48 3.79 3.25 4.09 83.2 146. Nauk 41 1.000 7.91 1.59 1.13 27.5 0.36 3.98 3.80 3.74 73.7 227. Nauk 42 1.000 9.01 1.60 1.39 28.0 0.45 3.91 4.90 4.40 83.6 122. Nauk 43 1.000 5.90 0.77 0.79 11.1 0.29 2.79 3.05 2.83 110. 100.

Sample factor Sm Ta Tb Th Ti% U W Yb Zn Zr Nauk 44 1.000 5.37 1.17 0.78 15.3 0.45 3.69 2.90 2.80 106. 158. Nauk 47 1.000 6.18 0.84 0.72 19.1 0.53 4.46 3.69 2.67 94.8 162. Nauk 51 1.000 5.19 0.93 0.74 11.5 0.41 2.50 3.74 3.00 85.1 134. Nauk 52 1.000 3.86 0.54 0.60 5.98 – 3.14 4.52 3.76 82.1 45.8 Nauk 53 1.000 7.97 1.57 1.01 31.6 0.39 5.43 4.93 3.51 76.7 242. Nauk 54 1.000 5.58 1.12 0.73 15.3 0.47 3.96 – 3.10 83.0 157. Nauk 55 1.000 3.42 0.51 0.74 5.37 0.57 2.38 3.24 2.23 82.2 141. Nauk 56 1.000 3.75 0.53 0.55 5.21 0.44 2.91 12.5 2.16 49.8 58.9 Nauk 57 1.000 6.81 0.92 0.98 12.4 0.35 2.40 5.67 3.37 136. 109. Nauk 58 1.000 5.56 1.08 0.81 15.3 0.67 3.06 6.52 3.23 83.0 149. Nauk 59 1.000 3.42 0.75 0.42 8.38 0.57 2.00 5.50 2.14 177. 197. Nauk 62 1.000 5.28 0.82 0.64 15.7 0.46 3.29 2.46 2.59 98.4 75.4 Nauk 63 1.000 5.59 0.89 0.68 19.5 0.49 3.90 2.88 2.57 110. – Nauk 64 1.000 7.77 1.05 1.06 22.2 0.60 3.99 2.99 3.50 101. – Nauk 65 1.000 4.76 0.85 0.65 13.3 0.42 3.39 2.40 2.56 81.1 68.5 Nauk 66 1.000 7.40 1.47 0.94 19.7 0.50 2.67 2.61 4.09 123. 190. Nauk 67 1.000 3.43 0.50 0.58 5.34 0.71 1.91 1.61 2.32 65.9 91.8 Nauk 68 1.000 3.54 0.51 0.52 5.86 0.71 1.94 1.23 2.26 72.2 38.8 Nauk 69 1.000 5.93 1.10 0.83 14.7 0.71 2.87 2.25 3.27 89.7 144. Nauk 70 1.000 6.13 1.17 0.88 14.8 0.61 2.61 2.16 3.30 92.1 139. Nauk 72 1.000 6.62 1.27 0.93 17.3 0.64 2.89 3.61 3.73 123. 164. Nauk 73 1.000 6.09 1.20 0.75 15.6 0.45 3.94 3.14 3.19 93.3 65.9 Nauk 74 1.000 4.91 0.92 0.70 12.1 0.49 2.78 1.96 2.50 84.2 114. Nauk 76 1.000 5.29 1.28 0.68 16.8 0.63 4.51 3.28 3.03 129. 60.8 Nauk 77 1.000 8.53 1.17 1.17 19.2 0.66 4.00 3.21 4.18 113. 149. Nauk 78 1.000 5.99 1.13 0.80 14.3 0.55 3.43 2.23 3.01 70.8 123. Nauk 79 1.000 6.17 1.30 0.87 6.12 1.02 1.49 1.78 3.21 112. 199. Nauk 80 1.000 3.32 0.65 0.50 4.61 0.52 2.61 0.83 2.03 138. 67.0 Nauk 81 1.000 6.20 1.33 0.93 6.15 0.98 1.92 2.46 3.09 120. 213. Nauk 82 1.000 7.28 1.43 1.06 7.20 1.03 2.26 2.13 3.67 109. 307. Nauk 83 1.000 6.35 1.22 1.01 6.12 1.01 1.51 1.83 3.47 112. 308. Nauk 84 1.000 6.87 1.31 1.00 18.3 0.50 2.82 3.36 3.62 144. 140. Nauk 85 1.000 5.88 1.07 0.81 12.6 0.45 3.61 2.28 2.80 105. 46.0 Nauk 86 1.000 6.01 1.14 0.87 12.7 0.40 3.57 2.33 3.03 112. 98.4 Nauk 87 1.000 6.02 1.37 0.78 17.8 0.55 3.93 2.36 3.28 114. 132. Nauk 88 1.000 3.80 0.78 0.57 7.49 0.29 1.32 1.41 2.13 59.0 74.4 Defe 1 1.000 3.49 0.89 0.64 9.63 0.47 1.92 1.95 2.30 80.7 119. Defe 2 1.000 3.06 0.66 0.52 7.99 0.43 2.20 1.72 1.95 97.9 60.4 Defe 3 1.000 2.61 0.60 0.45 7.26 0.25 1.39 1.69 1.70 93.5 138. Defe 4 1.000 2.43 0.62 0.39 6.85 0.41 1.56 1.64 1.75 108. 86.3

Table 1 ff:

Sample factor Sm Ta Tb Th Ti% U W Yb Zn Zr Defe 5 1.000 2.94 0.71 0.48 7.99 0.41 1.58 1.30 1.90 82.6 129. Defe 6 1.000 5.14 1.19 0.88 13.2 0.60 1.92 5.84 3.36 116. 168. Defe 7 1.000 5.25 1.19 0.95 16.6 0.78 2.95 2.74 3.42 107. 166. Defe 8 1.000 3.23 0.73 0.54 10.3 0.50 1.63 1.17 2.03 97.4 164. Defe 9 1.000 5.67 1.18 0.91 16.5 0.67 2.93 2.54 3.34 104. 222. Defe 10 1.000 6.47 1.42 0.98 6.82 1.12 1.54 1.72 3.52 114. 318. Defe 11 1.000 7.64 1.36 1.11 22.2 0.46 3.73 3.47 3.84 124. 131. Defe 12 1.000 8.22 1.10 1.12 19.8 0.47 3.32 3.97 3.75 105. 212. Defe 13 1.000 6.11 1.13 0.88 14.9 0.46 2.48 3.49 3.33 98.1 178. Defe 14 1.000 6.30 1.21 0.97 15.4 3.48 1.87 3.61 2.11 102. 195. Defe 15 1.000 5.95 1.21 0.93 15.8 0.56 2.72 3.77 3.40 99.0 220. Defe 16 1.000 6.82 0.92 0.81 23.0 0.36 3.82 4.52 2.78 114. 136. Defe 17 1.000 6.72 0.92 0.86 20.6 0.48 3.49 3.98 2.83 110. 143. Abus 1 1.000 4.14 0.75 0.67 10.3 0.31 2.15 1.80 2.25 80.2 123. DlEgy 1 1.000 7.23 1.35 0.99 18.0 0.64 3.66 3.78 3.79 137. 145. TbEgy 1 1.000 – 1.36 0.83 17.4 0.68 2.83 3.13 3.30 113. 277. Kari 1 1.000 5.91 1.22 0.84 17.3 1.36 5.05 2.83 2.95 135. – Kari 2 1.000 7.08 1.38 1.06 19.7 1.05 2.73 2.33 4.07 125. 130. Knid 1 1.000 4.69 0.91 0.72 11.9 0.45 2.15 2.29 2.74 107. 69.3 Bere 11 1.000 8.93 1.04 1.05 21.2 0.51 3.90 2.01 3.62 110. 43.3 Emec 31 1.000 6.49 1.24 0.86 15.3 0.54 2.61 2.95 3.47 112. 191. TeKa 3 1.000 9.81 1.19 1.34 23.0 0.38 4.41 2.53 4.34 102. 227. Kame 2 1.000 3.57 0.81 0.53 10.2 0.40 2.63 2.35 2.39 58.1 118. Milet 41 1.000 – 1.29 0.95 6.09 1.02 1.10 1.72 2.96 111. 368. Rhod 20 1.000 3.11 1.15 0.51 9.73 0.63 1.85 2.18 1.90 80.6 112. av.meas.error 0.025 0.033 0.081 0.076 0.079 0.10 0.22 0.057 5.7 29. in % 0.4 2.9 9.3 0.5 12. 3.7 7.8 1.8 5.5 18.